0.97 0.98 0.99 1 1.01 1.02 1.03 ZED / L V0M L 0 20 40 60 80 100 120 140 160

)^{-1}bμ (L

ALICE = 5.02 TeV NNs Pb, −Pb

ALI-PUB-569761

ALI-PUB-569761